6.042J/18.062J Fall 96 Distribution of Quiz 1 Grades Handout 19(Mean = 61.7, Median = 63, Standard Deviation =15.6)001132622373315305101520253035400...9.510...19.520...29.530...39.540...49.550...59.560...69.570...79.580...89.590...100Scores (out of 100)

Number of Students (total 150)